REM $Id: applylog.sql 3443 2008-02-01 15:56:18Z hardya $
set echo on
spool s:\orabackup\webmip\scripts\applylog.log
connect sys/fmdidgad as sysdba
alter database recover automatic standby database until cancel;
alter database recover cancel;
spool off;
exit
