--application/create_application
 
begin
 
wwv_flow_api.create_flow(
  p_id    => 155,
  p_display_id=> 155,
  p_owner => 'MIP_DEV_E',
  p_name  => 'webmip',
  p_alias => 'WEBMIP',
  p_page_view_logging => 'YES',
  p_default_page_template=> 24734011047526756 + wwv_flow_api.g_id_offset,
  p_printer_friendly_template=> 24735530196526758 + wwv_flow_api.g_id_offset,
  p_default_region_template=> 24740611526526770 + wwv_flow_api.g_id_offset,
  p_error_template    => 24734616867526758 + wwv_flow_api.g_id_offset,
  p_page_protection_enabled_y_n=> 'Y',
  p_checksum_salt_last_reset => '20071129174644',
  p_home_link         => 'f?p=&APP_ID.:1',
  p_box_width         => '98%',
  p_flow_language     => 'en-gb',
  p_flow_language_derived_from=> 'FLOW_PRIMARY_LANGUAGE',
  p_flow_image_prefix => '/i/',
  p_documentation_banner=> '',
  p_authentication    => 'CUSTOM2',
  p_login_url         => '',
  p_logout_url        => 'wwv_flow_custom_auth_std.logout?p_this_flow=&FLOW_ID.&p_next_flow_page_sess =&FLOW_ID.:500',
  p_application_tab_set=> 1,
  p_logo_image => 'TEXT:',
  p_public_url_prefix => '',
  p_public_user       => 'APEX_PUBLIC_USER',
  p_dbauth_url_prefix => '',
  p_proxy_server      => '',
  p_cust_authentication_process=> '.'||to_char(13718119800323842 + wwv_flow_api.g_id_offset)||'.',
  p_cust_authentication_page=> '',
  p_custom_auth_login_url=> '',
  p_flow_version      => 'release 1.0',
  p_flow_status       => 'AVAILABLE_W_EDIT_LINK',
  p_flow_unavailable_text=> 'This application is currently unavailable at this time.',
  p_build_status      => 'RUN_AND_BUILD',
  p_exact_substitutions_only=> 'Y',
  p_vpd               => '',
  p_csv_encoding    => 'N',
  p_theme_id => 101,
  p_default_label_template => 24749138532526789 + wwv_flow_api.g_id_offset,
  p_default_report_template => 24743617611526775 + wwv_flow_api.g_id_offset,
  p_default_list_template => 24748312327526783 + wwv_flow_api.g_id_offset,
  p_default_menu_template => 24750232156526795 + wwv_flow_api.g_id_offset,
  p_default_button_template => 24749440874526790 + wwv_flow_api.g_id_offset,
  p_default_chart_template => 24737941385526765 + wwv_flow_api.g_id_offset,
  p_default_form_template => 24738214051526765 + wwv_flow_api.g_id_offset,
  p_default_wizard_template => 24742135446526770 + wwv_flow_api.g_id_offset,
  p_default_tabform_template => 24740611526526770 + wwv_flow_api.g_id_offset,
  p_default_reportr_template   =>24740611526526770 + wwv_flow_api.g_id_offset,
  p_default_menur_template => 24737010408526765 + wwv_flow_api.g_id_offset,
  p_default_listr_template => 24740611526526770 + wwv_flow_api.g_id_offset,
  p_last_updated_by => 'PRIESTJ',
  p_last_upd_yyyymmddhh24miss=> '20071129174644',
  p_required_roles=> wwv_flow_utilities.string_to_table2(''));
 
 
end;
/

prompt  ...authorization schemes
--
 
begin
 
